3.9 4 4.1 4.2 4.3 4.4 4.5 4.6 x 10^5

6.12

6.13

6.14

6.15

6.16

6.17

6.18 x 10^6

Temperature corrected T_b [K] for R02 in v-pol

Easting [m]

Northing [m]

200

220

240

260

280

300

320

340

360